High Performance SSD Wholesale NVMe Gen3 SSD Hard Drive

High Performance SSD Wholesale NVMe Gen3 SSD Hard Drive

High Performance SSD Wholesale NVMe Gen3 SSD a high-speed internal SSD built to power gaming rigs, creative workstations, and high-performance laptops. Engineered with PCIe Gen3 x4 interface and 3D NAND flash, this 1TB internal gaming SSD offers blazing-fast read and write speeds—ideal for seamless gaming, system booting, video editing, and multitasking.

Unlike traditional SATA or USB drives, this NVMe SSD delivers up to 3,500MB/s read and 3,000MB/s write speeds, significantly outperforming even the best external SSD for gaming PC. Whether you’re a gamer upgrading a system, a tech reseller, or a manufacturer sourcing SSD USB 1TB solutions, this drive is built to deliver pro-level performance and reliability.

While this unit is internal, we also offer compatible Wholesale NVMe Gen3 SSD solutions for clients needing external storage systems like Thunderbolt 3 portable SSDs, 2TB external SSDs, and portable SSD 10TB or portable SSD 16TB external hard drive formats.

Key Features

Ultra-Fast Performance – PCIe Gen3 x4 NVMe interface with speeds up to 3500MB/s

Gaming Ready – Optimized for high-load gaming, modding, and fast boot operations

1TB Storage Capacity – Ideal for large game files, software, media, and OS installations

Thermal Management – Optional heatsink for enhanced cooling during heavy workloads

High-Endurance 3D NAND – Delivers long-term reliability and consistent speed

Wide Compatibility – Works with desktops, gaming laptops, and some external enclosures

Upgradeable Options – Also available in 2TB and 4TB capacities

Customizable – OEM/ODM options available including logo, firmware, and packaging

External Alternatives – Available in Wholesale NVMe Gen3 SSD and Wholesale NVMe Gen3 SSD  formats

Export Friendly – Bulk-ready for global resellers of portable harddrives, large external SSD drives, and external hard drive 8TB portable solutions

Customization Options (OEM/ODM)

We offer tailored solutions for distributors, resellers, and system builders:

Logo Printing – Laser or color logo on SSD shell

Custom Firmware – Firmware tuning for specific performance or thermal profiles

Packaging – Retail box design, anti-static OEM packs, or custom blister

Capacity Ranges – 256GB, 512GB, 1TB, 2TB, 4TB NVMe options available

Form Factor Adjustments – M.2 2280, 2242 formats for compact system compatibility

External Enclosure Kits – Turn internal SSDs into NVMe SSD external drives (USB 3.2 / Thunderbolt 3 enclosures)

Bundle Offers – Combine with 4TB USB hard drive, 2.5 external hard drive, or SSD external HDD formats

Specifications Table

Feature | Description
Model | 1TB NVMe Gen3 Internal SSD
Interface | PCIe Gen3 x4 NVMe 1.3
Form Factor | M.2 2280
Capacity | 1TB (also available in 256GB / 512GB / 2TB / 4TB)
NAND Flash Type | 3D NAND
Sequential Read Speed | Up to 3,500 MB/s
Sequential Write Speed | Up to 3,000 MB/s
MTBF (Mean Time Between Failures) | 1,800,000 hours
TBW (Terabytes Written) | ≥ 600 TB
Operating Temperature | 0°C ~ 70°C
Storage Temperature | -40°C ~ 85°C
Dimensions | 80mm × 22mm × 2.5mm
Weight | Approx. 8g
OS Compatibility | Windows 10/11, Linux, macOS
Certifications | CE, FCC, RoHS
Warranty | 3 or 5 years (depending on order specs)
Upgrade Option | Available in NVMe Gen4 and external enclosure kits

This 1TB internal NVMe SSD is a must-have for any brand offering high-performance storage or building powerful systems. It also complements your line of portable external hard drives for laptops, 4TB SSD drive external, and best external hard drives for Windows 10 by offering an upgrade path from external to internal speeds.

View Catalog :