Wholesale Customized MSATA SSD 240GB Internal Hard Disk

Wholesale Customized MSATA SSD 240GB Internal Hard Disk

Wholesale Customized MSATA SSD is an ideal solution for businesses and resellers seeking reliable, high-speed storage in bulk. Designed for integration into laptops, industrial PCs, and embedded systems, this drive delivers superior performance, fast data access, and excellent durability — all in a compact mSATA form factor.

Whether you’re a system integrator, distributor, or OEM, we offer Wholesale Customized MSATA SSD and bulk packaging options to meet your business needs. This 240GB mSATA SSD is perfect for replacing traditional 2.5 external hard drives or upgrading older SATA HDDs, offering higher speeds and better energy efficiency.

Our drives can also be bundled with external enclosures, turning them into portable external hard drives for laptops or ultra-compact external SSD disks for Windows and Mac systems. If you’re looking to match the performance of more extensive drives such as portable SSD 16TB external hard drive, 4TB USB hard drive, or best external SSD for gaming PCs, this internal SSD is a great foundation component.

Key Features:

Capacity: 240GB – perfect for boot drives, applications, and light storage

Interface: mSATA III (6Gb/s) – optimized for fast and reliable data transfers

Custom Options: OEM branding, firmware optimization, and custom packaging available

Application Ready: Compatible with laptops, embedded devices, POS systems, and more

Durability: Shock and vibration resistant; low power consumption

Ideal for Wholesale: Volume pricing available for distributors and resellers

Why Choose This SSD for Custom and Wholesale Needs?

This 240GB mSATA SSD is a cost-effective alternative to Wholesale Customized MSATA SSD or portable SSD 10TB options. While it’s more compact in capacity, it delivers excellent speed and reliability that can be extended with NVMe SSD external drive adapters or Thunderbolt 3 portable SSD enclosures for enhanced performance.

If you’re sourcing for businesses needing reliable internal drives or creating kits with portable RAID drives and external SATA SSDs, this SSD fits into any customized solution, making it highly versatile.

Technical Specifications:

Specification | Details
Capacity | 240GB
Form Factor | mSATA
Interface | SATA III (6 Gb/s)
NAND Flash Type | MLC / TLC (customizable)
Read Speed | Up to 550 MB/s
Write Speed | Up to 500 MB/s
MTBF (Mean Time Before Failure) | 1.5 million hours
Shock Resistance | 1500G, 0.5ms
Vibration Resistance | 20G (peak), 10-2000Hz
Power Consumption | <2W (Active) / <0.5W (Idle)
Operating Temperature | 0°C to 70°C
Storage Temperature | -40°C to 85°C
Warranty | 3 Years (customizable)
Customization Options | Logo printing, firmware, packaging

Expandability & Compatibility

While the base model is 240GB, we also offer expanded options to match other use cases, including:

SSD USB 1TB for faster backups

2T external SSD and Wholesale Customized MSATA SSD configurations

4TB SSD drive external solutions for media professionals

Integrate into RAID or convert into portable harddrives with enclosures

View Catalog :